From 5a82c74822d3272df2f5929133680478c0cfb4bd Mon Sep 17 00:00:00 2001
From: Paul Eggert <eggert@cs.ucla.edu>
Date: Fri, 6 Sep 2019 22:40:42 -0700
Subject: Prefer https to http for gnu.org and fsf.org URLs

Also, change sources.redhat.com to sourceware.org.
This patch was automatically generated by running the following shell
script, which uses GNU sed, and which avoids modifying files imported
from upstream:

sed -ri '
  s,(http|ftp)(://(.*\.)?(gnu|fsf|sourceware)\.org($|[^.]|\.[^a-z])),https\2,g
  s,(http|ftp)(://(.*\.)?)sources\.redhat\.com($|[^.]|\.[^a-z]),https\2sourceware.org\4,g
' \
  $(find $(git ls-files) -prune -type f \
      ! -name '*.po' \
      ! -name 'ChangeLog*' \
      ! -path COPYING ! -path COPYING.LIB \
      ! -path manual/fdl-1.3.texi ! -path manual/lgpl-2.1.texi \
      ! -path manual/texinfo.tex ! -path scripts/config.guess \
      ! -path scripts/config.sub ! -path scripts/install-sh \
      ! -path scripts/mkinstalldirs ! -path scripts/move-if-change \
      ! -path INSTALL ! -path  locale/programs/charmap-kw.h \
      ! -path po/libc.pot ! -path sysdeps/gnu/errlist.c \
      ! '(' -name configure \
            -execdir test -f configure.ac -o -f configure.in ';' ')' \
      ! '(' -name preconfigure \
            -execdir test -f preconfigure.ac ';' ')' \
      -print)

and then by running 'make dist-prepare' to regenerate files built
from the altered files, and then executing the following to cleanup:

  chmod a+x sysdeps/unix/sysv/linux/riscv/configure
  # Omit irrelevant whitespace and comment-only changes,
  # perhaps from a slightly-different Autoconf version.
  git checkout -f \
    sysdeps/csky/configure \
    sysdeps/hppa/configure \
    sysdeps/riscv/configure \
    sysdeps/unix/sysv/linux/csky/configure
  # Omit changes that caused a pre-commit check to fail like this:
  # remote: *** error: sysdeps/powerpc/powerpc64/ppc-mcount.S: trailing lines
  git checkout -f \
    sysdeps/powerpc/powerpc64/ppc-mcount.S \
    sysdeps/unix/sysv/linux/s390/s390-64/syscall.S
  # Omit change that caused a pre-commit check to fail like this:
  # remote: *** error: sysdeps/sparc/sparc64/multiarch/memcpy-ultra3.S: last line does not end in newline
  git checkout -f sysdeps/sparc/sparc64/multiarch/memcpy-ultra3.S
---
 nptl_db/structs.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'nptl_db/structs.def')

diff --git a/nptl_db/structs.def b/nptl_db/structs.def
index 0d5b65c907..f834d1d74c 100644
--- a/nptl_db/structs.def
+++ b/nptl_db/structs.def
@@ -14,7 +14,7 @@
 
    You should have received a copy of the GNU Lesser General Public
    License along with the GNU C Library; if not, see
-   <http://www.gnu.org/licenses/>.  */
+   <https://www.gnu.org/licenses/>.  */
 
 #ifndef DB_STRUCT_ARRAY_FIELD
 # define DB_STRUCT_ARRAY_FIELD(type, field) DB_STRUCT_FIELD (type, field)
-- 
cgit 1.4.1

